Three different views of the capture buffer:

You may select any combination of three different views
of the frame data which is in the capture buffer.  The
selected views will all share the screen and be
adjusted to fit. Any one of them can be enlarged by
zooming it so that it fills the entire screen whenever
you wish.

The summary view:

The summary view window shows several frames at a time.
A frame is represented by one or more lines of
condensed information, each of which shows a brief
encoding of the most important verb or parameter for
one protocol level of the frame.  The lines are
identified by the code name of the protocol interpreter
which recognized that portion of the frame data.

The detail view:

The detail view represents only one frame, but provides
a very complete interpretation of the fields and
options for all the nested protocols which are
recognized in the frame.  The full display is often
larger than the window, but you may scroll it.

The lines are separated into sections for the various
protocols.  Each protocol is indicated by a title for
its section and by a code name at the at the left of
each line.

The hex/character view:

This view shows one frame in hexadecimal format with an
ASCII or EBCDIC character translation to the right.
Non-alphanumeric values are indicated on the right by
the character "."

By using the menu options you may pick one or the other
translation to be used for all frames, or permit the
system to choose automatically based on the frame type.
In the latter case, EBCDIC will be used for MAC and SNA
frames, and ASCII otherwise.
